<template>
	<view class="container">
		<!-- 头部添加打卡时间区域 -->
		<view class="add">
			<view class="icon" @click="handleAdd">
				<img src="../../static/add.png">
			</view>
			<view class="title" @click="handleAdd">
				添加打卡时间
			</view>
			<view class="none"></view>
		</view>

		<!-- 打卡时间列表 -->
		<view class="list">
			<uni-swipe-action>
				<!-- 每一个时间段区域 -->
				<uni-swipe-action-item :auto-close="true" :right-options="options" @click="onClick(item.id)"
					v-for="item in list" :key="item.id">
					<view class="box">
						<view class="left">
							<view class="week">
								<view class="key">
									星期
								</view>
								<view class="value">
									{{item.week}}
								</view>
							</view>
							<view class="week">
								<view class="key">
									时段
								</view>
								<view class="value">
									{{item.time}}
								</view>
							</view>
						</view>
						<view class="right">
							<img src="../../static/right.png">
						</view>
					</view>
				</uni-swipe-action-item>
			</uni-swipe-action>
		</view>
	</view>
</template>

<script>
	export default {
		data() {
			return {
				list: [{
						id: 1,
						week: "周一，周二，周三，周四，周五，周六，周日",
						time: "09:00-17:00、20:00-21:00、22:00-23:00"
					},
					{
						id: 2,
						week: "周一，周二，周三，周四，周五，周六，周日",
						time: "09:00-17:00"
					},
					{
						id: 3,
						week: "周一，周二，周三，周四，周五，周六，周日",
						time: "12:00-17:00"
					},
					{
						id: 4,
						week: "周一，周二，周三，周四，周五，周六，周日",
						time: "09:00-17:00、20:00-21:00、22:00-23:00"
					},
				],
				options: [{
					text: '删除',
					style: {
						backgroundColor: '#D43030'
					}
				}],
			}
		},
		methods: {
			handleAdd() {
				console.log("添加打卡时间");
				uni.navigateTo({
					url:"/pages/setPunchTime/setPunchTime"
				})
			},
			// 点击右侧删除按钮回调
			onClick(id) {
				console.log(id);
				uni.showModal({
					title: '提示',
					content: '确定删除该打卡时间吗？',
					success: function(res) {
						if (res.confirm) {
							console.log('用户点击确定');
							uni.showToast({
								title: "删除成功",
								icon: 'success'
							})
						} else if (res.cancel) {
							console.log('用户点击取消');
						}
					}
				});
			},
		}
	}
</script>

<style lang="scss" scoped>
	.container {
		padding-top: 20rpx;

		.add {
			display: flex;
			margin: 0 auto;
			width: 690rpx;
			height: 87rpx;
			line-height: 87rpx;
			border-radius: 14rpx;
			background-color: #fff;

			.icon {
				flex: 1;
				display: flex;
				justify-content: center;
				align-items: center;

				img {
					width: 36rpx;
					height: 36rpx;
				}
			}

			.title {
				flex: 3;
				font-size: 30rpx;
				color: #0082FC;
			}

			.none {
				flex: 5;
			}
		}

		.list {
			margin-top: 20rpx;
			padding-bottom: 30rpx;

			.box {
				display: flex;
				margin: 0 auto;
				margin-bottom: 20rpx;
				width: 690rpx;
				height: 132rpx;
				border-radius: 14rpx;
				background-color: #fff;

				.left {
					flex: 5;
					display: flex;
					flex-direction: column;
					margin-left: 17rpx;

					.week {
						flex: 1;
						display: flex;
						align-items: center;
						font-size: 24rpx;

						.key {
							flex: 1;
							margin-left: 8rpx;
							color: #A6A6A6;
						}

						.value {
							flex: 5;
							overflow: hidden;
							white-space: nowrap;
							text-overflow: ellipsis;
						}
					}
				}

				.right {
					flex: 2;
					display: flex;
					justify-content: flex-end;
					align-items: center;

					img {
						margin-right: 20rpx;
						width: 20rpx;
						height: 30rpx;
					}
				}
			}
		}
	}

	// 解决左滑区域突出问题
	::v-deep .uni-swipe_button-group {
		margin-bottom: 20rpx;
	}
</style>
